NEXTSTEP f or Intel Pr ocessor s OCTOBER 1993

6066 South State Street Salt Lak e City, Utah 84107 FTP ftp.byu.edu (800) 748-4558 (801) 268-8877 (801) 268-9096 (f ax) v2.01

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 2 of 20

NEXTSTEP f or Intel Pr ocessor s October 1993

Alpine Computing MicroAge , a NeXT Premium Gold Reseller and the nation� s premier source f or NEXTSTEP-compatib le hardw are products , is pleased to off er its pr ice-competitiv e, high-perf ormance , diverse line of 100%-guar anteed, NEXTSTEP-compatib le hardw are .

In this edition of the catalog Alpine Computing proudly announces the Alpine NXstation b y Lexar. With a VESA b us upg radeab le to PCI and Opti with the easy addition of a simple r iser card, as w ell as a ZIF soc ket for Pentium upg rades , the NXstation off ers expandability w ell into the future . Currently Alpine and Le xar are cer tifying the Alpine NXstation b y Lexar for future inclusion in the NeXT Hardw are Compatibility Guide .

Alpine Computing guar antees all systems in this catalog as NEXTSTEP-compatib le and will preinstall NEXTSTEP on an y computer in this catalog�within cer tain guidelines , you need not purchase the softw are from us . Alpine offers GSA pr icing, discounts with large orders , and educational discounts on selected products with proof of status . Additionally, Alpine can ful�ll large orders with custom integ ration and assemb ly. Alpine is a MicroAge fr anchisee with super ior buying po wer, accepts cor porate purchasing orders on appro ved credit, off ers leasing, and accepts educational and go vernment purchasing orders with no appro val necessar y.

Alpine Computing is the most dedicated NEXTSTEP-compatib le hardw are reseller in the mar ketplace . The home to the Salt Lak e area NeXT Group and a suppor ter of the Utah Computer Society , Alpine Computing has a large stak e in helping NEXTSTEP �ourish in the mar ketplace and in suppor ting the national NeXT comm unity with �plug-�n�-play� NEXTSTEP workstations . Alpine Computing�s goal: to mak e purchasing NEXTSTEP hardw are as easy and saf e as order ing black hardw are from NeXT . But don�t listen to us�ask an y of Alpine�s NEXTSTEP clients .

Alpine Computing updates this Product Catalog as NeXT mak es a vailable ne w hardw are con�gur ations . For the latest Product Catalog, request the latest edition from Alpine Computing at 801/268-8877. T o retr ieve this catalog via the Inter net ftp to ftp .byu.edu with the login anon ymous and an y pass word or send email to nxstore@magn usson.uucp ({uunet, hellgate}!unislc!uplherc!cusa!neb!magn usson!nxstore). F or current pr icing information please contact Alpine Computing.

For a complete list of hardw are requirements f or running NEXTSTEP , request the latest edition of the NEXTSTEP Hardw are Compatibility Guide from NeXT at 800/TR Y-NeXT. NeXT�s guide and other inf ormation are also a vailable from NeXTans wers , NeXT�s free document-retr ieval system. F or NeXTans wers by fax, call 415/780-3990 from a touch-tone phone . For NeXTans wers via the Internet ftp to ftp .next.com with the login anon ymous and an y pass word or send email to ne xtans wers@ne xt.com with the tw o-word subject: INDEX HELP .

Thanks f or joining the mo ve to the w orld�s best NEXTSTEP hardw are v endor . We�re glad to ha ve you as par t of our circle of fr iends .

Kris Magn usson NEXTSTEP Specialist Alpine Computing MicroAge

' 1993 Alpine Computing MicroAge . All rights reser ved. NeXT, the NeXT logo , NEXTSTEP, the NEXTSTEP logo , and NeXTans wers are tr ademar ks of NeXT Computer , Inc. All other tr ademar ks mentioned in this Product Catalog belong to their respectiv e owners . Product speci�cations and pr ices are subject to change without notice . Alpine is not responsib le for errors and/or omissions .

6066 South State Street Salt Lak e City, Utah 84107 801/268-8877 (v oice) 801/268-9096 (f ax)

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 3 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

CPU 256 KB cache 60

VIDEO

ATI Graphics Ultr a Pro 2 MB VL-Bus 395 Actix GraphicsENGINE Ultr a VLPlus 2 MB 450 RAM 1 MB 70 ns (up to 8) 71 4 MB 70 ns (up to 8) 190 8 MB 70 ns (one only) 456

DISK

Maxtor 345 MB SCSI 458 Quantum 525 MB SCSI-F 788 DEC 1.0 GB SCSI 1090

SCSI AD APTER

Adaptec 1540C SCSI adapter ISA 240

NETWORK

Intel EtherExpress16C (A UI/thin net/10Base-T) 150

SOUND

ProAudio Spectr um 16 195

ALPINE NXstation b y LEXAR

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Notes Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

NXstation Slimline

VL-Bus ISA 486DX2/66 ATI Graphics Ultra Pro 2 MB (n/i)

1 MB (72 Hz)

2 MB (72 Hz)

0 MB 0 MB 2 ISA/VL 2 2 ser 1 par

Bus pg radeab le to PCI, Opti with riser card (n/i) ZIF soc ket FCC Class B 1-yr on-site w arranty keyboard mouse n/i 200 watt p/s

1299

Actix Ultra VLplus 2 MB (n/i)

2 MB (60 Hz)

2 MB (60 Hz)

NXstation Minitower

VL-Bus ISA 486DX2/66 ATI Graphics Ultra Pro 2 MB (n/i)

1 MB (72 Hz)

2 MB (72 Hz)

0 MB 0 MB 2 ISA/VL 2 2 ser 1 par

Bus pg radeab le to PCI, Opti with riser card (n/i) ZIF soc ket FCC Class B 1-year on-site w arranty keyboard mouse n/i

1299

Actix Ultra VLplus 2 MB (n/i)

2 MB (60 Hz)

2 MB (60 Hz)

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 4 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

VIDEO

ATI Graphics Ultr a Pro 2 MB VL-Bus 395 RAM 1 MB 70 ns (up to 8) 71 4 MB 70 ns (up to 8) 190

DISK

Maxtor 345 MB SCSI 458 Quantum 525 MB SCSI-F 788 DEC 1.0 GB SCSI 1090

SCSI AD APTER

Adaptec 1540C SCSI adapter ISA 240

ALR Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Evolution IVe VL-Bus ISA 486DX2/66 256K

ATI Graphics Ultra Pro 1 MB

1 MB 2 MB 4 MB 2 ISA/VL 3 ISA

2 2 ser 1 par

Tri-Combo (n/s) keyboard mouse

1369

Evolution V VL-Bus ISA Pentium 60 MHz 256K

ATI Graphics Ultra Pro 2MB

1 MB 2 MB 8 MB 2 ISA/VL 3 ISA

2 2 ser 1 par

Tri-Combo (n/s) keyboard mouse

2495

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 5 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

VIDEO

QVision 1280/E 1 MB 650 1 MB VRAM upgrade f or QVision 1280/E 167 RAM 8 MB module (534400) 453 8 MB memor y expansion board with 7 a vailable slots�required (534800) 710

COMPAQ

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Deskpro M CPQ-A- 13090

EISA 486DX2/66 QVision 1280/E (not included)

1 MB 2 MB 1 MB 2 MB 8 MB 240 MB IDE 4 4 2 ser 1 par keyboard mouse DOS/Win

3587

Deskpro M CPQ-A- 13095

EISA 486DX2/66 QVision 1280/E (not included)

1 MB 2 MB 1 MB 2 MB 8 MB 510 MB IDE 4 4 2 ser 1 par keyboard mouse DOS/Win

4120

Deskpro 5M CPQ-A- 12005

EISA Pentium 60 MHz QVision 1280/E 1 MB 2 MB 1 MB 2 MB 8 MB 240 MB IDE 4 4 2 ser 1 par keyboard mouse DOS/Win

5323

Deskpro 5M CPQ-A- 12010

EISA Pentium 60 MHz QVision 1280/E 1 MB 2 MB 1 MB 2 MB 8 MB 510 MB IDE 4 4 2 ser 1 par keyboard mouse DOS/Win

5855

Deskpro 5M CPQ-A- 12015

EISA Pentium 66 MHz QVision 1280/E 1 MB 2 MB 1 MB 2 MB 16 MB 510 MB IDE 4 4 2 ser 1 par keyboard mouse DOS/Win

7452

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 6 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

RAM 4 MB 70 ns (one only) 220 16 MB 70 ns (one only) 764

EPSON

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024 NX 258250

ISA 486DX2/66 Wingine 2MB 2 MB 20 MB 0 MB IDE 4 ISA 2 1 ser 1 par

Intel EtherExpress 16c Pro Audio Studio 16 keyboard mouse DOS/Win

3435

NX A432271

ISA 486DX2/66 Wingine 2MB 2 MB 20 MB 170 M IDE 4 ISA 2 1 ser 1 par

Intel EtherExpress 16c Pro Audio Studio 16 keyboard mouse NS/I user DOS/Win

4154

NX A432261

ISA 486DX2/66 Wingine 2MB 2 MB 20 MB 240 M IDE 4 ISA 2 1 ser 1 par

Intel EtherExpress 16c Pro Audio Studio 16 keyboard mouse NS/I user DOS/Win

4261

NX A432261

ISA 486DX2/66 Wingine 2MB 2 MB 36 MB 525 M SCSI-F

4 ISA 2 1 ser 1 par

Intel EtherExpress 16c Adaptec 1542B Pro Audio Studio 16 keyboard mouse NS/I user DOS/Win

5840

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 7 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

RAM 2 MB module (up to 3) 106 4 MB module (up to 3) 223 8 MB module (up to 3) 489 16 MB module (up to 3) 818

HEWLETT-PACKARD

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Vectra N HPC-A- 11470

ISA 486DX/33 S3-805 512 KB 1 MB 1 MB 4 MB 0 MB IDE 4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

1469

Vectra N HPC-A- 11475

ISA 486DX/33 S3-805 512 KB 1 MB 1 MB 4 MB 120 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

1729

Vectra N HPC-A- 11480

ISA 486DX/33 S3-805 512 KB 1 MB 1 MB 4 MB 240 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

1949

Vectra N HPC-A- 11485

ISA 486DX2/66 S3-805 512 KB 1 MB 1 MB 4 MB 240 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

2479

Vectra XM HPC-A- 11865

ISA 486DX/33 S3-805 1 MB 1 MB 1 MB 4 MB 0 MB IDE 4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

2039

Vectra XM HPC-A- 11870

ISA 486DX/33 S3-805 1 MB 1 MB 1 MB 4 MB 170 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

2409

Vectra XM HPC-A- 11875

ISA 486DX/33 S3-805 1 MB 1 MB 1 MB 4 MB 240 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

2539

Vectra XM HPC-A- 11895

ISA 486DX2/66 S3-805 1 MB 1 MB 1 MB 4 MB 0 MB IDE 4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

2669

Vectra XM HPC-A- 11900

ISA 486DX2/66 S3-805 1 MB 1 MB 1 MB 4 MB 240 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

3379

Vectra XM HPC-A- 11905

ISA 486DX2/66 S3-805 1 MB 1 MB 1 MB 4 MB 450 MB IDE

4 ISA 2 1 ser 1 par keyboard mouse DOS/Win

3749

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 8 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

RAM 2 MB module (up to 4) 115 4 MB module (up to 4) 232 8 MB module (up to 4) 483

DISK

Maxtor 345 MB SCSI 458 Quantum 525 MB SCSI-F 788

SCSI AD APTER

Adaptec 1540C SCSI adapter ISA (required) 240

IBM Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

466DX2/S IBM-A- 17885 ISA VL-Bus

486DX2/66 S3-805 1 MB 1 MB 1 MB 4 MB 0 MB IDE 4 ISA 4 SCSI adapter required keyboard mouse

1941

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 9 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

RAM 1 MB 70 ns (up to 2) 71 4 MB 70 ns (up to 2) 220 8 MB 70 ns (up to 2) 456 16 MB 70 ns (up to 2) 764

DISK

Maxtor 345 MB SCSI 458 Quantum 525 MB SCSI-F 788 DEC 1.0 GB SCSI 1090

SCSI AD APTER

DPT 2022 SCSI-2 adapter EISA (no cache) 375

INTEL

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Professional GX 9SS-T11511

EISA 486DX2/66 ATI 68800 2MB VL-Bus

2 MB 8 MB 0 Mb IDE 2 EISA 2 ISA

1 x 3.5�

1 ser 1 par

Adaptec 6360 (n/s) Built-in sound

2850

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 10 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

VIDEO

ATI Graphics Ultr a Pro 2 MB VL-Bus 395 RAM 1 MB 70 ns (up to 8) 71 4 MB 70 ns (up to 8) 190

DISK

Maxtor 345 MB SCSI 458 Quantum 525 MB SCSI-F 788 DEC 1.0 GB SCSI 1090

SCSI AD APTER

Adaptec 1540C SCSI adapter ISA 240

NCR Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

3333 NCR-A- 20055 ISA VL-Bus

486DX2/66 ATI Graphics Ultra Pro 2 MB (not included)

1 MB 1 MB 2 MB 0 MB 0 MB IDE 1 VL 3 ISA

2 2 ser 1 par

Graphics adapter(n/s) keyboard mouse DOS/Win

1740

3333 NCR-A- 20045 ISA VL-Bus

486DX2/66 ATI Graphics Ultra Pro 2 MB (not included)

1 MB 1 MB 2 MB 4 MB 120 MB IDE

1 VL 3 ISA

2 2 ser 1 par

Graphics adapter(n/s) keyboard mouse DOS/Win

2471

3333 NCR-A- 20050 ISA VL-Bus

486DX2/66 ATI Graphics Ultra Pro 2 MB (not included)

1 MB 1 MB 2 MB 4 MB 240 MB IDE

1 VL 3 ISA

2 2 ser 1 par

Graphics adapter(n/s) keyboard mouse DOS/Win

2690

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 11 of 20

NEXTSTEP-compatible desktop systems

OCTOBER 1993

VIDEO

ATI Graphics Ultr a Pro 2 MB EISA 395 RAM 1 MB 70 ns (up to 8) 71 4 MB 70 ns (up to 8) 190

ZENITH

Model Bus CPU Video 8-bit grayscale 16-bit color RAM Disk Slots Bays I/O Adapters Other Price

1024 x 768 1280 x 1024

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Z-Station XEn ZDS-A- 12940

EISA 486DX2/66 ATI Graphics Ultra Pro 2 MB EISA (not included)

1 MB 2 MB 8 MB 200 MB IDE

Graphics adapter(n/s) keyboard mouse DOS/Win

2471

Z-Station XEn ZDS-A- 12945

EISA 486DX2/66 ATI Graphics Ultra Pro 2 MB EISA (not included)

1 MB 2 MB 8 MB 400 MB IDE

Graphics adapter(n/s) keyboard mouse DOS/Win

3320

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 12 of 20

NEXTSTEP-compatible portable systems

OCTOBER 1993

RAM 4 MB expansion 259 8 MB expansion 950

DISK

160 MB 2.5� IDE 365

ACCESSORIES

14.4/14.4 F ax modem 599 AC adapter 99

AST Model Power source Panel type Built-in expansion Built-in panel

External monitor RAM Disk Docking station e xpansion CPU Price

640 x 480 640 x 480 800 x 600 1024 x 768 PowerExec 4SL 12108

Batter y Passiv e matrix mono

Fax modem 4 MB 0 MB IDE Graphics adapter(n/s) 486SL/25 1799

PowerExec 4SL 12155

Batter y Passiv e matrix mono

Fax modem 4 MB 200 MB IDE Graphics adapter(n/s) 486SL/25 2699

PowerExec 4SL 11848

Batter y Active matrix color

Fax modem 4 MB 200 MB IDE Graphics adapter(n/s) 486SL/25 3599

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 13 of 20

NEXTSTEP-compatible portable systems

OCTOBER 1993

RAM 16 MB expansion 1086

ACCESSORIES

14.4/9.6 F ax modem 649 Batter y pac k 187 AC adapter 132 desktop e xpansion base 599

COMPAQ

Model Power source Panel type Built-in expansion Built-in panel

External monitor RAM Disk Docking station e xpansion CPU Price

640 x 480 640 x 480 800 x 600 1024 x 768 LTE Lite 4/25c CPQ-A-11985

Batter y Active matrix color

Fax modem 4 MB 209 MB IDE ISA Keyboard mouse

486SL/25 4335

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 14 of 20

NEXTSTEP-compatible portable systems

OCTOBER 1993

RAM 4 MB memor y card 349 8 MB memor y card 699

ACCESSORIES

Docking station 699 14.4/9.6 F ax modem (not y et suppor ted under NS/I) 599 Batter y pac k 199 AC adapter 150

NEC Model Power source Panel type Built-in expansion Built-in panel

External monitor RAM Disk Docking station e xpansion CPU Price

640 x 480 640 x 480 800 x 600 1024 x 768 UltraLite Versa NEC-A-10975

Batter y Active matrix color

PCMCIA 4 MB 250 MB IDE ISA Keyboard mouse

486SL/33 5079

UltraLite Versa NEC-A-10970

Batter y Active matrix color

PCMCIA 4 MB 180 MB IDE ISA Keyboard mouse

486SL/33 4839

UltraLite Versa NEC-A-10950

Batter y Active matrix color

PCMCIA 4 MB 180 MB IDE ISA Keyboard mouse

486SL/25 4539

UltraLite Versa NEC-A-10960

Batter y Passiv e matrix mono

PCMCIA 4 MB 180 MB IDE ISA Keyboard mouse

486SL/33 3629

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 15 of 20

NEXTSTEP-compatible portable systems

OCTOBER 1993

RAM 8 MB memor y card 459 16 MB memor y card 2446

ACCESSORIES

Docking station 699 14.4/9.6 F ax modem 499 Batter y pac k 299 AC adapter 250

TOSHIBA

Model Power source Panel type Built-in expansion Built-in panel

External monitor RAM Disk Docking station e xpansion CPU Price

640 x 480 640 x 480 800 x 600 1024 x 768 T4400C NEC-A-10970

Batter y Active matrix color

PCMCIA 4 MB 200 MB IDE ISA Keyboard mouse

486DX/25 4413

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 16 of 20

NEXTSTEP-compatible peripherals

OCTOBER 1993

VIDEO

ATI Graphics Ultr a Pro 2 MB VL-Bus 395 ATI Graphics Ultr a Pro 2 MB EISA 395 Actix GraphicsENGINE Ultr a VLPlus 2 MB 450

SCSI DISK

Maxtor 120 MB SCSI 255 Conner 170 MB SCSI-2 260 Quantum 170 MB SCSI-2 265 Maxtor 345 MB SCSI-2 458 Fujitsu 1.2 GB SCSI-2 800 Quantum 525 MB SCSI-F 788 DEC 1.0 GB SCSI-2 1090 Fujitsu 1.2 GB SCSI-2 1656 DEC 1.6 GB SCSI-2 1699 DEC 2.1 GB SCSI-2 2378 PLI 5.25� magneto-optical 1.3 GB 3571

IDE DISK

Quantum 170 MB IDE 265 Conner 170 MB IDE 270 Conner 250 MB IDE 329 Maxtor 345 MB IDE 458 Conner 540 MB IDE 705

SCSI AD APTER

Adaptec 1540C SCSI adapter ISA 240 DPT 2022 SCSI-2 adapter EISA (no cache) 375

NETWORK ADAPTER

Intel EtherExpress16C (A UI/thin net/10Base-T) 150

SOUND

ProAudio Spectr um 16 195

INPUT DEVICE

Microsoft PS/2-style mouse 75 Microsoft ser ial mouse 75

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 17 of 20

NEXTSTEP-compatible monitors

OCTOBER 1993 CTX Model Size Res Max refresh rate

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Price

ProScan 8SS- D11912

15� .28 72 Hz 72 Hz 425

MITSUBISHI

Model Size Res Max refresh rate

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Price

DiamondPro Trinitron 8SS- D11189

17� .28 72 Hz 72 Hz 72 Hz 72 Hz 72 Hz 1249

NANAO

Model Size Res Max refresh rate

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Price

F550iw 17� .28 76 Hz 76 Hz 76 Hz 72 Hz 72 Hz 1350

T560iw 17� .28 76 Hz 76 Hz 76 Hz 72 Hz 72 Hz 1950

F750iw 21� .28 76 Hz 76 Hz 76 Hz 72 Hz 72 Hz 2550 NEC Model Size Res Max refresh rate

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Price

4FGe 15� .28 76 Hz 72 Hz 650

5FGe 17� .28 72 Hz 72 Hz 1350

6FG 21� .26 76 Hz 76 Hz 72 Hz 72 Hz 2650

SONY

Model Size Res Max refresh rate

800 x 600 1024 x 768 1120 x 832 1280 x 1024

Price

CPD1730 17� .28 72 Hz 72 Hz 72 Hz 1100

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 18 of 20

NEXTSTEP-compatible third-party products

OCTOBER 1993

Software

NeXT

NEXTSTEP f or Intel Processors Release 3.1User NEXTSTEP f or Intel Processors Release 3.1 De v

d�ART

Screen Mac hine Screen Machine Audio option TV tuner (including audio) Dots Monochrome Color Color Plus CJ10 CLC300/500 VarioData Single user Three user Five user Ten user Assistant Single user Three user Five user Ten user

ARES

ZZVolume

Software Commer cial Educational

UNTER ECKER

Compose In Color 1175 n/a Compose In Color �v e-user 4474 n/a Compose In Color w/o separ ation n/a 598 Compose In Color w/o separ ation �ve-user n/a 1786 The Blac k Box (no memor y) 5895 5100

GESTEL ITALIA

solidThinking Modeler 1370 700

i link

Apps call 370 323 fax 370 323 data 190 170 MIX Motorola Box+call 540 480 Box+call+fax 950 647 Box+call+fax+data 840 735 MIX Intel Box+call 790 691 Box+call+fax 950 858 Box+call+fax+data 1050 946 Objects Touch tone input on/off 140 128 Touch tone code entr y 140 128 Automatic call+repla y 210 187 Send selected f ax 210 187 Prog ram control 368 323 Plus P ak (all objects) 735 638

Commer cial Educational

655 n/a 1495 n/a

1795 1573 135 127 745 638

140 127 210 187 465 424 975 880 1425 1271

725 637 995 931 1350 1271 2115 1866

279 254 429 382 549 509 975 761

1786 998

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 19 of 20

NEXTSTEP-compatible third-party products

OCTOBER 1993

Software Commer cial Educational

i link (contin ued)

i56 with DSP and sound driver 395 352 direct 175 152 ticc 245 212 nice 105 101

FIRST CLASS NV

Tailor 470 248

XANTHUS

CraftMan 895 597 LaserMan 270 177 Questor 545 357 SplitBuilder 135 127 FrequentPhr ases 135 127 TSS DFax 140 105

BLACK AND WHITE

NXFax for Motorola 135 135

BLACK MARKET TECH

ConnectIt! 135 45

COMING SOON FROM ALPINE COMPUTING MICR OAGE

>>> Pages b y Pages >>> Windows applications and em ulation for white hardw are >>> PDO for Sun SP ARCstations >>> PDO for HP P A/RISC >>> Pentium upg rades f or white hardw are >>> Executor from ARDI >>> NXFax for NEXTSTEP/Intel . . . and . . .

NEXTSTEP f or HP P A/RISC

Alpine Computing NEXTSTEP/Intel Product Catalog October 1993 20 of 20

Order form

OCTOBER 1993

QTY PART NUMBER DESCRIPTION PRICE EXTENSION

CUSTOM CONFIGURATION CHARGES SHIPPING __ UPS Groundsa ver __ UPS Blue Label __ UPS Red Label __ F eder al Express Econom y __ Feder al Express Pr itoriy TAX (IF APPLICABLE) TOTAL

BILL TO:

First, last name Institution Address Phone , fax Email address

SHIP TO:

First, last name Institution Address Phone , fax Email address